400 600 800 1000 1200 1400 1600 1800 2000 0

100

200

300

400

500

CC[0]_LEFT_ADC Nent = 49650 Mean = 724.8 RMS = 279.8

CC[0]_LEFT_ADC_{CC[0]_LEFT_ADC}

400 600 800 1000 1200 1400 1600 1800 2000 0 50 100 150 200 250 300 350 400

CC[1]_LEFT_ADC Nent = 49650 Mean = 656.2 RMS = 303.8

CC[1]_LEFT_ADC_{CC[1]_LEFT_ADC}

400 600 800 1000 1200 1400 1600 1800 2000 0 20 40 60 80 100 120 140 160 180 200 220

CC[2]_LEFT_ADC Nent = 49650 Mean = 713.4 RMS = 345.4

CC[2]_LEFT_ADC_{CC[2]_LEFT_ADC}

600 800 1000 1200 1400 1600 1800 2000 0 20 40 60 80 100 120 140 160 180 CC[3]_LEFT_ADC Nent = 49650 Mean = 695.8 RMS = 237.9

CC[3]_LEFT_ADC_{CC[3]_LEFT_ADC}

400 600 800 1000 1200 1400 1600 1800 2000 0 100 200 300 400 500 600 700 800 900 CC[0]_RIGHT_ADC Nent = 49650 Mean = 685.7 RMS = 314

CC[0]_RIGHT_ADC_{CC[0]_RIGHT_ADC}

200 400 600 800 100012001400160018002000 0 50 100 150 200 250 300 350 CC[1]_RIGHT_ADC Nent = 49650 Mean = 480.6 RMS = 244.6

CC[1]_RIGHT_ADC_{CC[1]_RIGHT_ADC}

400 600 800 1000 1200 1400 1600 1800 2000 0

20

40

60

80

100

120

CC[2]_RIGHT_ADC Nent = 49650 Mean = 910.5 RMS = 446.9

CC[2]_RIGHT_ADC_{CC[2]_RIGHT_ADC}

400 600 800 1000 1200 1400 1600 1800 2000 0

20

40

60

80

100

120 CC[3]_RIGHT_ADC Nent = 49650 Mean = 616.7 RMS = 367.6

CC[3]_RIGHT_ADC_{CC[3]_RIGHT_ADC}