400 600 800 1000 1200 1400 1600 1800 2000 0

50

100

150

200

250

CC[0]_LEFT_ADC Nent = 28959 Mean = 873 RMS = 365.4

CC[0]_LEFT_ADC_{CC[0]_LEFT_ADC}

400 600 800 1000 1200 1400 1600 1800 2000 0 20 40 60 80 100 120 140 160 180 CC[1]_LEFT_ADC Nent = 28959 Mean = 808.3 RMS = 392.2

CC[1]_LEFT_ADC_{CC[1]_LEFT_ADC}

400 600 800 1000 1200 1400 1600 1800 2000 0 10 20 30 40 50 60 70 80 90 CC[2]_LEFT_ADC Nent = 28959 Mean = 856.6 RMS = 422.3

CC[2]_LEFT_ADC_{CC[2]_LEFT_ADC}

600 800 1000 1200 1400 1600 1800 2000 0

10

20

30

40

50

60 CC[3]_LEFT_ADC Nent = 28959 Mean = 887.8 RMS = 360.1

CC[3]_LEFT_ADC_{CC[3]_LEFT_ADC}

400 600 800 1000 1200 1400 1600 1800 2000 0 20 40 60 80 100 120 140

CC[0]_RIGHT_ADC Nent = 28959 Mean = 885.7 RMS = 389.5

CC[0]_RIGHT_ADC_{CC[0]_RIGHT_ADC}

200 400 600 800 1000 12001400 160018002000 0 20 40 60 80 100 120 140 160 180 200

CC[1]_RIGHT_ADC Nent = 28959 Mean = 603.7 RMS = 339.7

CC[1]_RIGHT_ADC_{CC[1]_RIGHT_ADC}

400 600 80010001200140016001800200022002400 0

20

40

60

80

100

120

CC[2]_RIGHT_ADC Nent = 28959 Mean = 950.2 RMS = 598.5

CC[2]_RIGHT_ADC_{CC[2]_RIGHT_ADC}

200 400 600 800 1000 12001400 160018002000 0 10 20 30 40 50 60 70

CC[3]_RIGHT_ADC Nent = 28959 Mean = 723.5 RMS = 470

CC[3]_RIGHT_ADC_{CC[3]_RIGHT_ADC}