0 200 400 600 800 1000 1200 1400 1600 0 200 400 600 800 1000

1200

1400

2 x10 htemp Nent = 234801 Mean = 460.1 RMS = 32.78

la9t {lt9t <=0. || lt9t>=4000.}

0 200 400 600 800 1000 1200 1400 0 200 400 600 800 1000

1200

1400

1600 2 x10 htemp Nent = 234729 Mean = 370.1 RMS = 27.1

la9b {lt9b <=0. || lt9b>=4000.}

0 200 400 600 800 1000 1200 0 200 400 600 800 1000

1200

1400 2 x10 htemp Nent = 239136 Mean = 436.2 RMS = 31.96

la10t {lt10t <=0. || lt10t>=4000.}

0 200 400 600 800 1000 1200 0 200 400 600 800 1000

1200

1400 2 x10 htemp Nent = 239551 Mean = 352.5 RMS = 32.47

la10b {lt10b <=0. || lt10b>=4000.}

0 500 1000 1500 2000 2500 3000 3500 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200

2400 2 x10 htemp Nent = 234683 Mean = 479.5 RMS = 34.77

la11t {lt11t <=0. || lt11t>=4000.}

0 500 1000 1500 2000 2500 3000 3500 0 200 400 600 800 1000

1200

2 x10 htemp Nent = 234566 Mean = 350.6 RMS = 29.21

la11b {lt11b <=0. || lt11b>=4000.}

0 500 1000 1500 2000 2500 0 200 400 600 800 1000

1200

1400 2 x10 htemp Nent = 234183 Mean = 419.4 RMS = 31.23

la12t {lt12t <=0. || lt12t>=4000.}

0 500 1000 1500 2000 2500 3000 3500 0 200 400 600 800 1000

1200

1400

1600

1800

2000

2200 2 x10 htemp Nent = 234103 Mean = 275.9 RMS = 24.25

la12b {lt12b <=0. || lt12b>=4000.}

0 200 400 600 800 1000 1200 0 200 400 600 800 1000

1200

1400 2 x10 htemp Nent = 234895 Mean = 580.6 RMS = 41.29

la13t {lt13t <=0. || lt13t>=4000.}

0 100 200 300 400 500 600 700 800 900 0

2000

4000

6000

8000

10000 1 x10 htemp Nent = 234776 Mean = 492 RMS = 36.04

la13b {lt13b <=0. || lt13b>=4000.}

0 200 400 600 800 1000 1200 0 200 400 600 800 1000

1200

1400 2 x10 htemp Nent = 234344 Mean = 471 RMS = 34.23

la14t {lt14t <=0. || lt14t>=4000.}

0 200 400 600 800 1000 1200 0

2000

4000

6000

8000

10000 1 x10 htemp Nent = 234342 Mean = 477.1 RMS = 35.17

la14b {lt14b <=0. || lt14b>=4000.}

0 200 400 600 800 1000 1200 1400 1600 0 200 400 600 800 1000

1200

1400

2 x10 htemp Nent = 234684 Mean = 516.7 RMS = 37.3

la15t {lt15t <=0. || lt15t>=4000.}

0 200 400 600 800 1000 0

2000

4000

6000

8000

10000 1 x10 htemp Nent = 234687 Mean = 470 RMS = 34.01

la15b {lt15b <=0. || lt15b>=4000.}

0 200 400 600 800 1000 0

2000

4000

6000

8000

10000 1 x10 htemp Nent = 234352 Mean = 505.2 RMS = 36.01

la16t {lt16t <=0. || lt16t>=4000.}

0 100 200 300 400 500 600 700 800 900 0

10000

20000

30000

40000

50000 htemp

Nent = 234334 Mean = 454.1 RMS = 36.3

la16b {lt16b <=0. || lt16b>=4000.}

htemp