0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 50 100 150 200 250 300 350 htemp Nent = 3517 Mean = 1627 RMS = 946.6

la1t {lt1t>0. && lt1t<4000. && lt1b>0. && lt1b<4000. && la1t>0 && la1t<10000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 50 100 150 200 250 300 350 htemp Nent = 3519 Mean = 1515 RMS = 866.5

la1b {lt1t>0. && lt1t<4000. && lt1b>0. && lt1b<4000. && la1b>0 && la1b<10000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0

50

100

150

200 250 htemp Nent = 3113 Mean = 1706 RMS = 1071

la2t {lt2t>0. && lt2t<4000. && lt2b>0. && lt2b<4000. && la2t>0 && la2t<10000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0

50

100

150

200 250 htemp Nent = 3112 Mean = 1748 RMS = 1059

la2b {lt2t>0. && lt2t<4000. && lt2b>0. && lt2b<4000. && la2b>0 && la2b<10000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 200 400 600 800 1000

1200

1400

1600 htemp

Nent = 4921 Mean = 1265 RMS = 935.6

la3t {lt3t>0. && lt3t<4000. && lt3b>0. && lt3b<4000. && la3t>0 && la3t<10000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 200 400 600 800 1000

1200

1400

1600

htemp Nent = 4920 Mean = 1239 RMS = 962

la3b {lt3t>0. && lt3t<4000. && lt3b>0. && lt3b<4000. && la3b>0 && la3b<10000.}

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 50 100 150 200 250 300 350 400 450 htemp Nent = 2956 Mean = 1537 RMS = 1084

la4t {lt4t>0. && lt4t<4000. && lt4b>0. && lt4b<4000. && la4t>0 && la4t<10000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 50 100 150 200 250 300 350 400 htemp Nent = 2958 Mean = 1489 RMS = 1128

la4b {lt4t>0. && lt4t<4000. && lt4b>0. && lt4b<4000. && la4b>0 && la4b<10000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 50 100 150 200 250 300 350 400 htemp Nent = 4851 Mean = 1692 RMS = 1108

la5t {lt5t>0. && lt5t<4000. && lt5b>0. && lt5b<4000. && la5t>0 && la5t<10000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 50 100 150 200 250 300 350 400 htemp Nent = 4834 Mean = 1745 RMS = 1192

la5b {lt5t>0. && lt5t<4000. && lt5b>0. && lt5b<4000. && la5b>0 && la5b<10000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0

50

100

150

200 250 htemp Nent = 3631 Mean = 1824 RMS = 1146

la6t {lt6t>0. && lt6t<4000. && lt6b>0. && lt6b<4000. && la6t>0 && la6t<10000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0

50

100

150

200 250 htemp Nent = 3619 Mean = 1970 RMS = 1243

la6b {lt6t>0. && lt6t<4000. && lt6b>0. && lt6b<4000. && la6b>0 && la6b<10000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0

50

100

150

200 250 htemp Nent = 3688 Mean = 1907 RMS = 1193

la7t {lt7t>0. && lt7t<4000. && lt7b>0. && lt7b<4000. && la7t>0 && la7t<10000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0

50

100

150

200 250 htemp Nent = 3674 Mean = 1920 RMS = 1238

la7b {lt7t>0. && lt7t<4000. && lt7b>0. && lt7b<4000. && la7b>0 && la7b<10000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 50 100 150 200 250 300 350 400 htemp Nent = 5017 Mean = 1795 RMS = 1155

la8t {lt8t>0. && lt8t<4000. && lt8b>0. && lt8b<4000. && la8t>0 && la8t<10000.}

htemp

0 1000 2000 3000 4000 5000 6000 7000 8000 9000 0 50 100 150 200 250 300 350 400 htemp Nent = 4997 Mean = 1880 RMS = 1195

la8b {lt8t>0. && lt8t<4000. && lt8b>0. && lt8b<4000. && la8b>0 && la8b<10000.}

htemp