---------------------------------------------------
	LCC0_T0:  -2019		LCC0_B0:  -2099
	LCC0_T1:  -1999		LCC0_B1:  -2220
	LCC0_T2:  -2655		LCC0_B2:  -2165
---------------------------------------------------
	RCC0_T0:  -2299		RCC0_B0:  -2641
	RCC0_T1:  -2628		RCC0_B1:  -2655
	RCC0_T2:  -2325		RCC0_B2:  -2257
---------------------------------------------------
	LCC1_T0:  -2465		LCC1_B0:  -2552
	LCC1_T1:  -2290		LCC1_B1:  -2655
	LCC1_T2:  -2360		LCC1_B2:  -2358
	LCC1_T3:  -2557		LCC1_B3:  -2391
---------------------------------------------------
	RCC1_T0:  -2554		RCC1_B0:  -2520
	RCC1_T1:  -2655		RCC1_B1:  -2378
	RCC1_T2:  -2101		RCC1_B2:  -2107
	RCC1_T3:  -2292		RCC1_B3:  -2444
---------------------------------------------------
----------------------- LEFT SECTOR ----------------------------------
---------First Box Top------------------------------------------------
INSERT INTO CC_HV VALUES('CcHv-L-T-0', 4, 5, 0, NULL, -2019., -500.);
INSERT INTO CC_HV VALUES('CcHv-L-T-1', 4, 5, 1, NULL, -1999., -500.);
INSERT INTO CC_HV VALUES('CcHv-L-T-2', 4, 5, 2, NULL, -2655., -500.);
--------First Box Bottom----------------------------------------------
INSERT INTO CC_HV VALUES('CcHv-L-B-0', 4, 5, 6, NULL, -2099., -500.);
INSERT INTO CC_HV VALUES('CcHv-L-B-1', 4, 5, 7, NULL, -2220., -500.);
INSERT INTO CC_HV VALUES('CcHv-L-B-2', 4, 5, 8, NULL, -2165., -500.);
----------------------------------------------------------------------
---------Second Box Top-----------------------------------------------
INSERT INTO CC_HV VALUES('CcHv-L-T-3', 4, 6, 0, NULL, -2465., -500.);
INSERT INTO CC_HV VALUES('CcHv-L-T-4', 4, 6, 1, NULL, -2290., -500.);
INSERT INTO CC_HV VALUES('CcHv-L-T-5', 4, 6, 2, NULL, -2360., -500.);
INSERT INTO CC_HV VALUES('CcHv-L-T-6', 4, 6, 3, NULL, -2557., -500.);
--------Second Box Bottom---------------------------------------------
INSERT INTO CC_HV VALUES('CcHv-L-B-3', 4, 6, 6, NULL, -2552., -500.);
INSERT INTO CC_HV VALUES('CcHv-L-B-4', 4, 6, 7, NULL, -2655., -500.);
INSERT INTO CC_HV VALUES('CcHv-L-B-5', 4, 6, 8, NULL, -2358., -500.);
INSERT INTO CC_HV VALUES('CcHv-L-B-6', 4, 6, 9, NULL, -2391., -500.);
----------------------------------------------------------------------
----------------------- RIGHT SECTOR ---------------------------------
---------First Box Top------------------------------------------------
INSERT INTO CC_HV VALUES('CcHv-R-T-0', 1, 5, 0, NULL, -2299., -500.);
INSERT INTO CC_HV VALUES('CcHv-R-T-1', 1, 5, 1, NULL, -2628., -500.);
INSERT INTO CC_HV VALUES('CcHv-R-T-2', 1, 5, 2, NULL, -2325., -500.);
--------First Box Bottom----------------------------------------------
INSERT INTO CC_HV VALUES('CcHv-R-B-0', 1, 5, 6, NULL, -2641., -500.);
INSERT INTO CC_HV VALUES('CcHv-R-B-1', 1, 5, 7, NULL, -2655., -500.);
INSERT INTO CC_HV VALUES('CcHv-R-B-2', 1, 5, 8, NULL, -2257., -500.);
----------------------------------------------------------------------
---------Second Box Top-----------------------------------------------
INSERT INTO CC_HV VALUES('CcHv-R-T-3', 1, 6, 0, NULL, -2554., -500.);
INSERT INTO CC_HV VALUES('CcHv-R-T-4', 1, 6, 1, NULL, -2655., -500.);
INSERT INTO CC_HV VALUES('CcHv-R-T-5', 1, 6, 2, NULL, -2101., -500.);
INSERT INTO CC_HV VALUES('CcHv-R-T-6', 1, 6, 3, NULL, -2292., -500.);
--------Second Box Bottom---------------------------------------------
INSERT INTO CC_HV VALUES('CcHv-R-B-3', 1, 6, 6, NULL, -2520., -500.);
INSERT INTO CC_HV VALUES('CcHv-R-B-4', 1, 6, 7, NULL, -2378., -500.);
INSERT INTO CC_HV VALUES('CcHv-R-B-5', 1, 6, 5, NULL, -2107., -500.);
INSERT INTO CC_HV VALUES('CcHv-R-B-6', 1, 6, 9, NULL, -2444., -500.);
----------------------------------------------------------------------
