CC_L0

Entries 488828 Mean 1116 RMS 693.4

0 1000 2000 3000 4000 5000 6000 7000 8000 0 2000

4000

6000

8000

10000

12000

14000

16000

18000

20000

ADC of CC L0 with NO CUTS CC_L1

Entries 202789 Mean 1053 RMS 594.2

0 1000 2000 3000 4000 5000 6000 7000 8000 0 1000

2000

3000

4000

5000

6000

7000

8000

9000

CC_L1

ADC of CC L1 with NO CUTS CC_L2

Entries 3637929 Mean 1314 RMS 608.6

0 1000 2000 3000 4000 5000 6000 7000 8000 0

2000

4000

6000

8000

10000 1 x10 CC_L2

ADC of CC L2 with NO CUTS

CC_R0

Entries 196205 Mean 1057 RMS 579.9

0 1000 2000 3000 4000 5000 6000 7000 8000 0 1000

2000

3000

4000

5000

6000

7000

8000

ADC of CC R0 with NO CUTS CC_R1

Entries 83759 Mean 845 RMS 367.8

0 1000 2000 3000 4000 5000 6000 7000 8000 0 500 1000

1500

2000

2500

3000

3500

4000

4500

CC_R1

ADC of CC R1 with NO CUTS CC_R2

Entries 170173 Mean 613.8 RMS 248.1

0 1000 2000 3000 4000 5000 6000 7000 8000 0 2000

4000

6000

8000

10000

12000

14000

CC_R2

ADC of CC R2 with NO CUTS