11 e and T 10 e d(e,e’d) Vector Analyzing Powers T

2 (GeV/c) 2Q 0 0.1 0.2 0.3 0.4 e 10T

-0.1

0

0.1

0.2

Beam-Gated Charge: 479 kC BLK: Monte Carlo Curve: Abbott Parameterization I

PRELIMINARY

2 (GeV/c) 2Q 0 0.1 0.2 0.3 0.4 e 11T

-0.1

0

0.1

0.2

PRELIMINARY

Beam-Gated Charge: 479 kC BLK: Monte Carlo Curve: Abbott Parameterization I