nBars_3_0

Entries 54651 Mean 7.695 RMS 3.894

LADS Bar

0 2 4 6 8 10 12 14 0

0.005

0.01

0.015

0.02

0.025

0.03

Neutron LADS

L20l

nBars_3_1

Entries 42696 Mean 7.719 RMS 3.803

LADS Bar

0 2 4 6 8 10 12 14 0

0.005

0.01

0.015

0.02

0.025

Neutron LADS L20r

nBars_3_2

Entries 17743 Mean 4.947 RMS 3.992

LADS Bar

0 2 4 6 8 10 12 14 0

0.002

0.004

0.006

0.008

0.01

0.012

Neutron LADS

L15l

nBars_3_3

Entries 18192 Mean 6.349 RMS 4.16

LADS Bar

0 2 4 6 8 10 12 14 0

0.002

0.004

0.006

0.008

0.01

Neutron LADS L15r

nOHIO_3_0

Entries 37343 Mean 3.489 RMS 2.167

OHIO bar #

0 1 2 3 4 5 6 7 8 0

0.005

0.01

0.015

0.02

0.025

0.03

Neutron OHIO Right OHIO

nOHIO_3_1

Entries 33505 Mean 4.326 RMS 2.562

OHIO bar #

0 1 2 3 4 5 6 7 8 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 -3 10× Neutron OHIO Left OHIO