htemp Entries 347313 Mean 0.4697 RMS 0.104

GeV/c

0.3 0.4 0.5 0.6 0.7 0.8 0.9

GeV/c

-0.004

-0.002

0

0.002

0.004

0.006 pml-pwl:pml {qwl==1&&qwr==-1&&abs(pml-pwl)<0.06}